-- 企业名称同步重试字段
ALTER TABLE pay_enterprise ADD COLUMN IF NOT EXISTS name_sync_status VARCHAR(1) DEFAULT '0';
ALTER TABLE pay_enterprise ADD COLUMN IF NOT EXISTS name_sync_retry_count INT DEFAULT 0;
ALTER TABLE pay_enterprise ADD COLUMN IF NOT EXISTS name_sync_next_time TIMESTAMP;

-- 已有记录默认标记为无需同步（避免大量重试）
UPDATE pay_enterprise SET name_sync_status = '1' WHERE name_sync_status = '0';
